CY7C68013-TQ100-PWR

12AGND

2GND

19GND

21GND

39GND

48GND

50GND

65GND

75GND

94GND

99GND

9AVCC

1VCC

16VCC

20VCC

33VCC

38VCC

49VCC

53VCC

66VCC

78VCC

85VCC

U412

EP1C12-PQ240-PWR

10GND

40GND

52GND

69GND

71GND

80GND

89GND

91GND

96GND

102GND

109GND

111GND

129GND

142GND

171GND

190GND

192GND

199GND

205GND

210GND

212GND

221GND

230GND

232GND

30GNDA_PLL1

151GNDA_PLL2

31GNDG_PLL1

150GNDG_PLL2

27VCCA_PLL1

154VCCA_PLL2

72VCCINT

81VCCINT

90VCCINT

97VCCINT

103VCCINT

110VCCINT

191VCCINT

198VCCINT

204VCCINT

211VCCINT

220VCCINT

229VCCINT

9VCCIO1

22VCCIO1

51VCCIO1

189VCCIO2

209VCCIO2

231VCCIO2

130VCCIO3

157VCCIO3

172VCCIO3

70VCCIO4

92VCCIO4

112VCCIO4

U101

TPS777XX-PWP

6 IN

7 IN

5 EN

4 NC

8 NC

3 GND

1 GND/HSINK

2 GND/HSINK

9 GND/HSINK

10 GND/HSINK

13 OUT 14 OUT 15 FB/NC 16 RESET/PG 17 NC 18 NC 11 GND/HSINK 12 GND/HSINK 19 GND/HSINK 20 GND/HSINK

U503

LT1085CM-3.3

3 VIN

1 GND 2 VOUT 4 VOUT

U502 2 1

3

J502 F501

C510 0.1uF

C502 100uF

C513 0.1uF

C507 22uF

C518 220pF

L509

C512 0.1uF

C505 220pF

C508 22uF

C514 0.1uF

C519 220pF

VCC1_5:1

5V:1 DVDD:1

L601

L600

C522 0.1uF

C524 220pF

C525 0.1uF

C526 220pF

DVDD:1 AVDD_2:1

AGND_2:1

C527 22uF

L510

L511

C516 0.1uF

C528 220pF

C515 0.1uF

C529 220pF

DVDD:1 AVDD_1:1

AGND_1:1

C523 22uF R503

240K

DVDD:1

VCC1_5:1

DVDD:1

AVDD_1:1

DVDD:1

AD986X-PWR

100AGND

103AGND

106AGND

109AGND

110AGND

112AGND

113AGND

116AGND

119AGND

122AGND

19AGND

24AGND

27AGND

28AGND

31AGND

11AGND

16AGND

2AGND

9AGND

34DGND

35DGND

52DGND

58DGND

60DGND

67DGND

94DGND

98AVDD

99AVDD

104AVDD

105AVDD

117AVDD

118AVDD

123AVDD

124AVDD

18AVDD

20AVDD

23AVDD

32AVDD

13AVDD

3AVDD

4AVDD

33DVDD

36DVDD

53DVDD

59DVDD

61DVDD

66DVDD

93DVDD

U601

AGND_1:1

AVDD_2:1

DVDD:1

U602

AGND_2:1

L401

C530 0.1uF

C531 220pF

C532 0.1uF

C533 220pF

C534 0.1uF

C535 220pF

C536 0.1uF

C537 220pF

C538 0.1uF

C539 220pF

C540 0.1uF

C541 220pF

C542 0.1uF

C543 220pF

C544 0.1uF

C545 220pF

C546 0.1uF

C547 220pF

C548 0.1uF

C549 220pF

C550 220pF

C551 0.1uF

C552 220pF

C553 0.1uF

C554 220pF

C555 0.1uF

C556 220pF

C557 0.1uF

C558 220pF

C559 0.1uF

C560 220pF

C561 0.1uF

C562 220pF

C563 0.1uF

C564 220pF

C565 0.1uF

C566 0.1uF

C567 220pF

C568 0.1uF

C569 220pF

C570 0.1uF

C571 220pF

C572 0.1uF

C573 220pF

C574 220pF

C575 0.1uF

C576 220pF

C577 0.1uF

C578 220pF

C579 0.1uF

C580 0.1uF

C581 220pF

C582 0.1uF

C583 220pF

C584 0.1uF

C585 220pF

C586 0.1uF

C587 220pF

C588 0.1uF

C589 220pF

C590 0.1uF

C591 220pF

C592 0.1uF

C593 220pF

C594 0.1uF

C595 220pF

C596 0.1uF

C597 220pF

C598 0.1uF

C599 220pF

C600 0.1uF

C601 220pF

C602 0.1uF

C603 220pF

C604 0.1uF

C605 220pF

C606 0.1uF

C607 220pF

C608 0.1uF

C609 220pF

C610 0.1uF

C611 220pF

C612 0.1uF

C613 220pF

C614 0.1uF

C615 220pF

C616 0.1uF

C617 220pF

C618 0.1uF

C619 220pF

C620 0.1uF

C621 220pF

C622 0.1uF

C623 220pF

C624 0.1uF

C625 220pF

C626 0.1uF

C627 220pF

C628 0.1uF

C629 220pF

C630 0.1uF

C631 220pF

C632 0.1uF

C633 220pF

C634 0.1uF

C635 220pF

C636 0.1uF

C637 220pF

C638 0.1uF

C639 220pF

C640 0.1uF

C641 220pF

C642 0.1uF

C643 220pF

C644 0.1uF

C645 220pF

USRP Power

$Date: 2005/02/16 01:19:23 $

$RCSfile: power.ps,v $ $Revision: 1.2 $

$Author: matt $

FILE: REVISION:

DRAWN BY:

PAGE OF

TITLE

H

G

F

E

D

C

B

A

I

J

K

I

J

K

H

G

F

E

D

C

B

A

1 2 3 4 5 6 7 8 9 10 11

1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17

12 13 14 15 16 17 1 4

C1020 220pF

1 2 3 4

J1001