<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\hypertarget{libscilab__octave_8h}{}\doxysection{sci\+\_\+gateway/cpp/libscilab\+\_\+octave.h File Reference}
\label{libscilab__octave_8h}\index{sci\_gateway/cpp/libscilab\_octave.h@{sci\_gateway/cpp/libscilab\_octave.h}}
{\ttfamily \#include \char`\"{}c\+\_\+gateway\+\_\+prototype.\+h\char`\"{}}\newline
\doxysubsection*{Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{libscilab__octave_8h_a40fa0a0ebe5ca7163a74872e50cc4f13}{C\+\_\+\+GATEWAY\+\_\+\+PROTOTYPE}} (\mbox{\hyperlink{sci__octave_8cpp_a74f2258789a64de6417c6d8912144449}{sci\+\_\+octave\+\_\+fun}})
\end{DoxyCompactItemize}


\doxysubsection{Function Documentation}
\mbox{\Hypertarget{libscilab__octave_8h_a40fa0a0ebe5ca7163a74872e50cc4f13}\label{libscilab__octave_8h_a40fa0a0ebe5ca7163a74872e50cc4f13}} 
\index{libscilab\_octave.h@{libscilab\_octave.h}!C\_GATEWAY\_PROTOTYPE@{C\_GATEWAY\_PROTOTYPE}}
\index{C\_GATEWAY\_PROTOTYPE@{C\_GATEWAY\_PROTOTYPE}!libscilab\_octave.h@{libscilab\_octave.h}}
\doxysubsubsection{\texorpdfstring{C\_GATEWAY\_PROTOTYPE()}{C\_GATEWAY\_PROTOTYPE()}}
{\footnotesize\ttfamily C\+\_\+\+GATEWAY\+\_\+\+PROTOTYPE (\begin{DoxyParamCaption}\item[{\mbox{\hyperlink{sci__octave_8cpp_a74f2258789a64de6417c6d8912144449}{sci\+\_\+octave\+\_\+fun}}}]{ }\end{DoxyParamCaption})}

</pre></body></html>