From c632c1009c9e095135220c809d7c799841f160b3 Mon Sep 17 00:00:00 2001
From: Fahim
Date: Tue, 9 Sep 2014 16:11:17 +0530
Subject: Subject: Changing all content and name of directory and file to
 FreeEDA

Description: The content of file,name of directory and file has been
changed in the below format.

1. Oscad to FreeEDA
2. OSCAD to FreeEDA
3. oscad to freeeda
---
 OSCAD/modelEditor/D.hlp | 16 ----------------
 1 file changed, 16 deletions(-)
 delete mode 100755 OSCAD/modelEditor/D.hlp

(limited to 'OSCAD/modelEditor/D.hlp')

diff --git a/OSCAD/modelEditor/D.hlp b/OSCAD/modelEditor/D.hlp
deleted file mode 100755
index fd0b2f8..0000000
--- a/OSCAD/modelEditor/D.hlp
+++ /dev/null
@@ -1,16 +0,0 @@
- 	name 	parameter  							units 		default 	example 	
-1 	IS 	saturation current 						A 		1.0e-14 	1.0e-14 	
-2 	RS 	ohmic resistanc							Ohm 		0 		10 	
-3 	N 	emission coefficient 						- 		1 		1.0 	
-4 	TT 	transit-time 							sec 		0 		0.1ns 	
-5 	CJO 	zero-bias junction capacitance 					F 		0 		2pF 		
-6 	VJ 	junction potential 						V 		1 		0.6 	
-7 	M 	grading coefficient 						- 		0.5 		0.5 	
-8 	EG 	band-gap energy 						eV 		1.11 		1.11 Si 	
-9 	XTI 	saturation-current temp.exp 					- 		3.0 		3.0 pn/ 2.0 Schottky 	
-10 	KF 	flicker noise coefficient 					- 		0	 		
-11 	AF 	flicker noise exponent 						- 		1 		
-12 	FC 	coefficient for forward-bias depletion capacitance formula 	- 		0.5 		
-13 	BV 	reverse breakdown voltage 					V 		infinite 	40.0 	
-14 	IBV 	current at breakdown voltage 					V 		1.0e-3 		
-15 	TNOM 	parameter measurement temperature 				deg C 		27 		50 
-- 
cgit 

